/*
 Navicat Premium Data Transfer

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 50626
 Source Host           : localhost
 Source Database       : test

 Target Server Type    : MySQL
 Target Server Version : 50626
 File Encoding         : utf-8

 Date: 02/11/2018 04:51:27 AM
*/

SET NAMES utf8;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
--  Table structure for `gpgmekeys`
-- ----------------------------
DROP TABLE IF EXISTS `gpgmekeys`;
CREATE TABLE `gpgmekeys` (
  `element` varchar(255) DEFAULT NULL
) ENGINE=InnoDB DEFAULT CHARSET=latin1;

-- ----------------------------
--  Records of `gpgmekeys`
-- ----------------------------
BEGIN;
INSERT INTO `gpgmekeys` VALUES ('gpgme'), ('keylist'), ('key'), ('revoked'), ('expired'), ('disabled'), ('invalid'), ('can-encrypt'), ('can-sign'), ('can-certify'), ('can-authenticate'), ('is-qualified'), ('protocol'), ('issuer'), ('serial'), ('chain-id'), ('owner-trust'), ('subkeys'), ('subkey'), ('keyid'), ('is_cardkey'), ('curve'), ('secret'), ('name'), ('comment');
COMMIT;

SET FOREIGN_KEY_CHECKS = 1;
